\documentstyle{l-aa}
\begin{document}
%%%%Table 2%%%%%

\setcounter{table}{1}
\begin{table*}
\caption[]{Line fluxes}
\begin{flushleft}
\begin{tabular}{lrrrrrrrrrrrr}
\hline\noalign{\smallskip}
Line & K5-1 & K5-3 & K5-4 & K5-5 & K5-6 & K5-7 & K5-9 & K5-11 & K5-12 & K5-13 & K5-14 & K5-16\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
$[OII]\lambda$3726+29 & - & 63.0 & 133.7 & - & - & - & - & - & - & 117.3 & - & -\\
$[NeIII]\lambda$3869 & - & 126.1 & 172.6 & - & - & 118.7 & - & - & 51.9 & 196.3 & 38.1 & -\\
$[NeIII]\lambda$3967 & - & 55.3 & 62.1 & - & - & - & - & - & 23.4 & 75.8 & - & -\\
$H\gamma\lambda$4340 & 65.5 & 56.2 & 57.3 & 91.6 & 65.5 & 74.6 & - & - & 75.5 & 54.2 & 41.7 & - \\
$[OIII]\lambda$4363 & 7.9 & 12.9 & 6.9 & 30.6 & 25.8 & 26.8 & - & 2.6 & 9.8 & 20.3 & 37.5 & -  \\
$HeI\lambda$4472 & 11.9 & 10.1 & 6.2 & 18.6 & 10.2 & - & 8.7 & - & - & 11.8 & 4.2 & -  \\
$HeII\lambda$4686 & - & 51.5 & - & - & 102.2 & 106.6 & 18.3 & 21.4 & 71.9 & 73.8 & 26.2 & 15.8  \\
$H\beta\lambda$4861 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0  \\
$[OIII]\lambda$4959 & 168.7 & 276.7 & 357.9 & 283.0 & 310.6 & 339.6 & 225.4 & 172.1 & 402.8 & 441.6 & 571.2 & 287.1  \\
$[OIII]\lambda$5007 & 507.7 & 818.9 & 1061.5 & 843.3 & 915.5 & 1024.7 & 659.3 & 496.4 & 1201.3 & 1328.9 & 1663.8 & 859.1  \\
$HeII\lambda$5412 & - & 4.6 & 0.4 & - & 13.6 & 6.0 & 1.9 & - & 5.4 & 6.6 & 2.4 & 2.3  \\
$[NII]\lambda$5755 & 0.9 & 0.5 & 1.9 & 2.0 & 2.9 & - & 0.7 & 3.1 & 0.7 & 4.3 & 6.4 & 6.1  \\
$HeI\lambda$5876 & 17.5 & 11.6 & 17.4 & 9.7 & 3.6 & 8.6 & 21.1 & 25.1 & 7.4 & 11.8 & 15.5 & 18.3  \\
$[OI]\lambda$6300 & 0.6 & 1.0 & 6.2 & 2.9 & 1.7 & 12.9 & 2.3 & 8.3 & 2.4 & 6.4 & 14.0 & 31.1  \\
$[SIII]\lambda$6312 & 0.7 & 1.4 & 1.8 & 1.3 & 1.8 & - & 0.6 & 1.1 & 1.9 & 6.0 & 3.9 & 5.0  \\
$[NII]\lambda$6548 & 4.2 & 10.7 & 25.4 & 3.7 & 2.3 & 9.5 & 11.7 & 107.9 & 6.8 & 111.5 & 58.1 & 164.8  \\
$H\alpha\lambda$6563 & 285.2 & 285.2 & 285.2 & 285.3 & 285.2 & 285.2 & 285.3 & 285.2 & 285.2 & 285.2 & 285.2 & 285.3  \\
$[NII]\lambda$6584 & 18.1 & 23.8 & 71.8 & 20.5 & 7.4 & 19.1 & 41.8 & 333.5 & 25.1 & 345.7 & 208.6 & 501.8  \\
$HeI\lambda$6678 & 5.1 & 3.7 & 4.4 & 4.2 & 2.4 & 4.6 & 6.4 & 7.6 & 2.4 & 5.2 & 4.4 & 5.7  \\
$[SII]\lambda$6716 & 1.4 & 3.4 & 3.2 & 1.5 & 2.5 & 5.4 & 2.7 & 25.4 & 2.8 & 28.9 & 8.6 & 59.5  \\
$[SII]\lambda$6731 & 1.9 & 4.4 & 6.1 & 3.0 & 2.9 & 4.6 & 4.4 & 26.8 & 5.0 & 35.9 & 16.6 & 62.3  \\
$[ArIII]\lambda$7135 & 15.5 & 11.0 & 15.3 & 10.4 & 8.9 & 24.7 & 16.1 & 19.5 & 91.4 & 40.4 & 32.3 & 24.5  \\
$[OII]\lambda$7320+30 & 2.4 & 2.8 & 11.7 & 10.0 & 2.0 & 3.7 & 3.3 & 6.0 & 3.3 & 5.2 & 26.5 & 10.8  \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
Line & K5-17 & K5-19 & K5-20 & SB01 & SB02 & SB03 & SB04 & SB06 & SB12 & SB15 & SB17 & SB18\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
$[OII]\lambda$3726+29  & - & - & 33.1 & 109.0 & 81.7 & 41.2 & - & 458.8 & - & 56.8 & 553.6 & 154.3 \\
$[NeIII]\lambda$3869  & - & - & 87.3 & 152.2 & 25.9 & 89.1 & 78.0 & 82.2 & - & 189.6 & - & 70.7  \\
$[NeIII]\lambda$3967  & - & - & 48.4 & 81.3 & 50.8 & - & - & 75.4 & - & - & 19.5 & 35.7  \\
$H\gamma\lambda$4340  & 32.4 & - & 47.3 & 35.8 & 53.4 & 49.1 & 49.3 & 36.5 & 37.3 & 46.5 & 53.8 & 35.5  \\
$[OIII]\lambda$4363  & 23.7 & 54.4 & 7.0 & 7.6 & 8.6 & 36.5 & 15.4 & 19.0 & 35.9 & 46.7 & - & 27.6  \\
$HeI\lambda$4472  & - & - & 7.9 & 22.4 & 18.1 & 3.8 & - & 12.5 & - & - & - & 12.7  \\
$HeII\lambda$4686  & - & 95.8 & - & 37.7 & 32.2 & 59.5 & 21.6 & 50.4 & 72.1 & 51.3 & - & 64.3  \\
$H\beta\lambda$4861  & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0  \\
$[OIII]\lambda$4959  & 408.2 & 422.1 & 269.7 & 164.9 & 159.9 & 208.6 & 181.0 & 154.8 & 322.6 & 442.5 & - & 339.2  \\
$[OIII]\lambda$5007  & 1247.1 & 1173.4 & 808.3 & 540.1 & 477.8 & 616.5 & 522.1 & 504.5 & 799.8 & 1300.1 & 13.4 & 972.8  \\
$HeII\lambda$5412  & 0.9 & - & - & - & - & 3.7 & - & 6.6 & - & 27.0 & - & -  \\
$[NII]\lambda$5755  & - & 1.6 & 1.8 & - & 2.6 & 1.6 & - & - & - & - & 6.5 & -  \\
$HeI\lambda$5876  & 14.1 & 10.4 & 17.6 & 6.7 & 18.3 & 14.2 & 11.7 & 10.1 & 11.9 & 11.8 & 18.6 & 6.0  \\
$[OI]\lambda$6300  & 2.4 & - & 3.1 & 7.0 & 13.6 & - & - & - & - & - & 37.4 & 3.7  \\
$[SIII]\lambda$6312  & 1.2 & - & 0.5 & - & - & - & - & - & - & - & - & -  \\
$[NII]\lambda$6548  & 5.7 & 13.5 & 2.0 & 6.7 & 28.4 & 12.1 & 42.7 & 176.5 & - & - & 94.5 & -  \\
$H\alpha\lambda$6563  & 285.2 & 285.2 & 285.2 & 285.1 & 285.1 & 285.1 & 285.0 & 285.1 & 285.0 & 285.1 & 285.1 & 285.0  \\
$[NII]\lambda$6584  & 20.8 & 42.8 & 4.5 & 17.5 & 78.5 & 42.4 & 116.4 & 531.6 & 7.5 & 1.6 & 256.6 & 3.6  \\
$HeI\lambda$6678  & 3.7 & 2.5 & 4.6 & 5.0 & 4.6 & 5.6 & 4.8 & 6.6 & 17.2 & 8.8 & 6.0 & 2.8  \\
$[SII]\lambda$6716  & 2.0 & 7.2 & 0.8 & 5.0 & 12.7 & 7.0 & 15.1 & 14.4 & - & - & 57.5 & 1.8  \\
$[SII]\lambda$6731  & 4.0 & 8.5 & 0.8 & 6.6 & 10.3 & 6.2 & 11.7 & 10.9 & - & 6.0 & 44.1 & 1.5  \\
$[ArIII]\lambda$7135  & 11.1 & 14.9 & 8.2 & 4.3 & 10.9 & 10.5 & 8.2 & 20.8 & 15.2 & 2.2 & 1.2 & 2.9  \\
$[OII]\lambda$7320+30  & 4.8 & 3.2 & 2.9 & 4.0 & 5.8 & - & 5.2 & 18.1 & - & 8.9 & 13.0 & 5.6  \\
\noalign{\smallskip}
\hline
\end{tabular}
\end{flushleft}
\end{table*}

%%%%Table 3%%%%

\begin{table*}
\caption[]{Line fluxes (continued)}
\begin{flushleft}
\begin{tabular}{lrrrrrrrrrrrr}
\hline\noalign{\smallskip}
Line & SB19 & SB20 & SB21 & SB24 & SB25 & SB26 & SB28 & SB30 & SB31 & SB32 & SB33 & SB34\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
$[OII]\lambda$3726+29  & 42.4 & 59.8 & - & 39.6 & 209.1 & 29.2 & - & 53.1 & 14.4 & 398.6 & 103.7 & -  \\
$[NeIII]\lambda$3869  & 63.1 & 254.1 & 51.9 & - & 97.1 & 126.3 & 55.9 & 74.8 & 84.5 & 60.2 & 24.5 & 79.6  \\
$[NeIII]\lambda$3967  & - & - & 30.6 & 35.8 & - & 53.9 & 25.5 & 32.3 & 36.2 & 34.2 & - & -  \\
$H\gamma\lambda$4340  & 31.9 & 36.4 & 54.6 & 21.6 & 49.9 & 40.1 & 66.2 & 52.1 & 63.6 & 47.0 & 51.1 & 68.5  \\
$[OIII]\lambda$4363  & 2.9 & 70.5 & 14.3 & 6.9 & 7.0 & 21.0 & 29.3 & 16.1 & 14.3 & 15.9 & 22.9 & 22.1  \\
$HeI\lambda$4472  & 7.6 & - & - & - & - & - & - & 3.6 & - & 9.4 & 28.9 & -  \\
$HeII\lambda$4686  & - & 30.2 & 116.9 & 90.7 & - & 94.5 & 116.2 & 46.6 & 117.0 & 25.7 & 17.5 & 140.4  \\
$H\beta\lambda$4861  & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0  \\
$[OIII]\lambda$4959  & 224.7 & 497.0 & 188.6 & 117.5 & 170.5 & 308.7 & 174.5 & 320.5 & 227.2 & 189.6 & 222.7 & 162.9  \\
$[OIII]\lambda$5007  & 648.7 & 1441.1 & 571.9 & 384.9 & 515.8 & 915.6 & 525.0 & 941.1 & 662.4 & 565.2 & 585.0 & 509.8  \\
$HeII\lambda$5412  & - & - & 7.9 & 3.2 & - & 7.4 & 6.7 & 3.6 & 7.3 & - & - & 21.5  \\
$[NII]\lambda$5755  & - & - & - & - & - & - & - & - & - & 5.0 & 11.9 & -  \\
$HeI\lambda$5876  & 22.5 & 13.7 & 4.0 & 5.8 & 18.1 & 3.0 & 1.1 & 10.5 & 1.3 & 15.1 & 10.7 & 2.4  \\
$[OI]\lambda$6300  & - & - & - & - & 9.3 & 2.4 & - & 4.2 & 0.9 & 32.1 & 31.8 & 7.9  \\
$[SIII]\lambda$6312  & 1.5 & - & - & - & 1.0 & 0.4 & - & 0.6 & 1.8 & 8.6 & - & -  \\
$[NII]\lambda$6548  & - & - & - & - & 107.0 & 2.5 & - & 6.4 & - & 37.6 & 77.0 & 7.9  \\
$H\alpha\lambda$6563  & 285.1 & 285.0 & 285.1 & 285.1 & 285.1 & 285.1 & 285.1 & 285.1 & 285.1 & 285.0 & 285.0 & 285.1  \\
$[NII]\lambda$6584  & 8.2 & 1.8 & 1.6 & 6.3 & 313.6 & 1.7 & 1.3 & 21.6 & 4.8 & 110.6 & 205.2 & 6.4  \\
$HeI\lambda$6678  & 8.5 & 2.8 & 1.4 & 6.8 & 4.2 & 2.5 & - & 2.8 & 1.8 & 7.9 & 10.2 & 1.3  \\
$[SII]\lambda$6716  & 2.7 & 3.9 & - & 2.1 & 38.4 & - & - & 1.2 & 1.0 & 32.8 & 32.3 & -  \\
$[SII]\lambda$6731  & 3.7 & 2.6 & - & 4.0 & 31.9 & - & - & 2.2 & 1.2 & 26.0 & 28.9 & -  \\
$[ArIII]\lambda$7135  & 19.8 & 3.0 & 7.8 & 4.8 & 19.6 & 5.4 & 4.4 & 5.3 & 5.5 & 8.8 & 15.7 & 4.6  \\
$[OII]\lambda$7320+30  & 14.6 & - & 3.0 & 10.3 & - & 1.0 & - & 6.0 & 1.2 & 15.9 & 12.9 & -  \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
Line &  SB35 & SB37 & SB38 & SB42 & SB44 & SB50 & SB52 & SB53 & SB55\\
\hline\noalign{\smallskip}
$[OII]\lambda$3726+29  & 29.8 & 38.4 & 6.0 & 35.8 & - & 72.5 & 33.4 & 43.0 & 15.4  \\
$[NeIII]\lambda$3869  & 73.0 & 132.2 & 63.1 & 29.1 & 25.1 & 62.9 & 68.2 & 71.1 & 56.6  \\
$[NeIII]\lambda$3967  & 18.9 & 47.3 & 13.4 & 26.9 & - & - & 37.5 & 39.0 & 24.0  \\
$H\gamma\lambda$4340  & 42.6 & 76.2 & 44.6 & 32.8 & 32.4 & 51.3 & 56.1 & 53.2 & 46.1  \\
$[OIII]\lambda$4363  & 8.3 & 32.5 & 26.1 & 3.0 & 6.7 & 20.0 & 12.1 & 23.7 & 17.0  \\
$HeI\lambda$4472  & 11.9 & - & - & 7.6 & - & - & 2.8 & - & -  \\
$HeII\lambda$4686  & - & 166.3 & 65.6 & 4.9 & 129.8 & 96.5 & 121.4 & 128.1 & 126.7  \\
$H\beta\lambda$4861  & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0 & 100.0  \\
$[OIII]\lambda$4959  & 266.2 & 401.8 & 303.1 & 89.0 & 188.0 & 228.5 & 228.6 & 312.7 & 123.7  \\
$[OIII]\lambda$5007  & 766.0 & 1213.7 & 888.2 & 245.0 & 627.5 & 685.7 & 674.9 & 904.5 & 353.0  \\
$HeII\lambda$5412  & - & 12.0 & 3.5 & - & 7.6 & 5.9 & 9.8 & 8.7 & 9.0  \\
$[NII]\lambda$5755  & 1.1 & - & - & 0.3 & - & - & 0.2 & 1.2 & -  \\
$HeI\lambda$5876  & 16.9 & - & 15.6 & 6.5 & 4.0 & 7.4 & 4.8 & 2.5 & 7.2  \\
$[OI]\lambda$6300  & - & 0.7 & - & - & - & - & 1.3 & 3.3 & -  \\
$[SIII]\lambda$6312  & - & 3.4 & - & - & - & - & 1.2 & 4.2 & -  \\
$[NII]\lambda$6548  & 3.4 & - & - & - & 15.1 & - & 0.8 & 5.6 & -  \\
$H\alpha\lambda$6563  & 285.1 & 285.1 & 285.0 & 285.1 & 285.0 & 285.0 & 285.0 & 285.1 & 285.1  \\
$[NII]\lambda$6584  & 2.7 & 13.9 & 2.2 & 10.8 & 19.8 & 14.0 & 5.6 & 16.1 & 3.2  \\
$HeI\lambda$6678  & 5.5 & 3.3 & 3.3 & 4.6 & 2.6 & 5.1 & 2.8 & 2.6 & 3.8  \\
$[SII]\lambda$6716  & 1.5 & 3.5 & 3.1 & 2.0 & 3.8 & 6.5 & 2.2 & 4.1 & 0.3 \\
$[SII]\lambda$6731  & - & 3.2 & - & 1.5 & 4.3 & 5.8 & 2.6 & 4.2 & 0.4  \\
$[ArIII]\lambda$7135  & 7.8 & - & 6.1 & 3.4 & 14.3 & 12.1 & 12.2 & 19.1 & 5.6  \\
$[OII]\lambda$7320+30  & 2.2 & 0.8 & 3.5 & 2.8 & 7.9 & - & 2.9 & - & 5.4  \\
\noalign{\smallskip}
\hline
\end{tabular}
\end{flushleft}
\end{table*}

\end{document}
