\documentstyle{article}
\topmargin -0.7cm
\pagestyle{empty}
\def \rv{RV$_{\rm 1}$}
\def \rvb{RV$_{\rm 2}$}
\def \rs {$R_\odot$}
\def \ms{${\cal M}_{\odot}$}
\def \ha{H$\alpha$ }
\def \vsi{$v\sin i$ }
\def \p{$\pm$ }
\def \m{.$\!\!^{\rm m}$}
\def \P{.$\!\!^{\rm P}$}
\def \D{.$\!\!^{\rm d}$}
\def \mi{${\cal M}_1$}
\def \mii{${\cal M}_2$}
\def \mit{$\dot{\MI}$}
\def \miit{$\dot{\MII}$}
\def \MI{M_{1}}
\def \MII{M_{2}}
\def \MIT{\dot {\MI}}
\def \MIIT{\dot {\MII}}
\def \k2{$K_2$}
\def \K2{K_{2}}
\def \kt{$\dot{\K2}$}
\def \KT{\dot {\K2}}
\def \pt{$\dot{P}$}
\def \PT{\dot P}
\def \mj{$^{\rm -1}$}
\def \dr{$^{\rm 2}$}
\def \tr{$^{\rm 3}$}
\def \MJ{^{-1}}
\def \DR{^{2}}
\def \TR{^{3}}
\def \t{$\times$10$^{\rm-7}$}
\def \g{$\gamma$}
\def \kms{km~s$^{-1}$}
\def \ks{(km~s$^{-1}$)}
\def \mv{$M_V$}
\def \mb{$M_{bol}$}
\def \lg{$\log g$}
\def \nmmm{nm~mm$^{-1}$}
\def \rs{R$_{\odot}$}
\def \si{Si~{\sc II}~2 }
\def \sia{Si~{\sc II}~2}
\def \st{.$\!\!^{\circ}$}
\def \tef{$T_{\rm eff}$ }
\def \tefn{$T_{\rm eff}$}
\def \vsi{$v$~sin~$i$ }
\def \vsin{$v$~sin~$i$}
\def \vo{V1046~Ori }
\def \vn{V1046~Ori}

\begin{document}

\setcounter{table}{2}
\begin{table*}
\caption[]{Photoelectric observations of V1046~Ori (in magnitudes)
which were observed in, or transformed into the standard Str\"omgren
system and were not previously published. Numbers in column
``Obs." correspond to those in column ``Instrument" of Table~2}
\label{phot}
\scriptsize
\begin{flushleft}
\begin{tabular}{llllllllllllrr}
\hline\noalign{\smallskip}
HJD-2400000&  y  &  b  &  u  &  v  & b-v & u-b & c1  & m1  & Obs. \cr
\noalign{\smallskip}\hline\noalign{\smallskip}
38670.9588&6.548&6.495&6.755& --  &-.053& .260& --  & --  &  1 \cr
38671.9125&6.546&6.505&6.773& --  &-.041& .268& --  & --  &  1 \cr
42770.305 &6.570& --  &6.777& --  & --  & --  & --  & --  &  2 \cr
42770.334 &6.570& --  &6.780& --  & --  & --  & --  & --  &  2 \cr
42770.365 &6.568& --  &6.777& --  & --  & --  & --  & --  &  2 \cr
42770.395 &6.565& --  &6.772& --  & --  & --  & --  & --  &  2 \cr
42770.424 &6.566& --  &6.768& --  & --  & --  & --  & --  &  2 \cr
42770.455 &6.562& --  &6.765& --  & --  & --  & --  & --  &  2 \cr
42770.485 &6.561& --  &6.766& --  & --  & --  & --  & --  &  2 \cr
42770.515 &6.561& --  &6.763& --  & --  & --  & --  & --  &  2 \cr
42770.544 &6.559& --  &6.760& --  & --  & --  & --  & --  &  2 \cr
44197.7076&6.561&6.496&6.746&6.542&-.065& .250& .158& .111&  4 \cr
44203.7708&6.559&6.494&6.737&6.534&-.065& .243& .163& .105&  4 \cr
44205.6258&6.567&6.509&6.765&6.557&-.058& .256& .160& .106&  4 \cr
48911.9132&6.570&6.514&6.767&6.556&-.056& .253& .169& .098&  6 \cr
48912.9444&6.554&6.499&6.751&6.551&-.055& .252& .148& .107&  6 \cr
48918.9339&6.589&6.518&6.775&6.567&-.071& .257& .159& .120&  6 \cr
48920.9351&6.572&6.511&6.765&6.561&-.061& .254& .154& .111&  6 \cr
48921.9157&6.575&6.512&6.754&6.549&-.063& .242& .168& .100&  6 \cr
48928.8740&6.583&6.514&6.770&6.571&-.069& .256& .142& .126&  6 \cr
48938.8478&6.580&6.521&6.770&6.568&-.059& .249& .155& .106&  6 \cr
48939.8705&6.570&6.512&6.770&6.554&-.058& .258& .174& .100&  6 \cr
48940.9170&6.570&6.509&6.746&6.556&-.061& .237& .143& .108&  6 \cr
48941.8735&6.572&6.513&6.753&6.556&-.059& .240& .154& .102&  6 \cr
48942.8737&6.563&6.499&6.737&6.560&-.064& .238& .116& .125&  6 \cr
48943.8906&6.567&6.511&6.748&6.561&-.056& .237& .137& .106&  6 \cr
48944.8640&6.573&6.507&6.754&6.568&-.066& .247& .125& .127&  6 \cr
48958.8875&6.577&6.506&6.751&6.554&-.071& .245& .149& .119&  6 \cr
49261.9323&6.556&6.502&6.736&6.562&-.054& .234& .114& .114&  6 \cr
49291.0173&6.578&6.522&6.772&6.563&-.056& .250& .168& .097&  6 \cr
49294.9800&6.572&6.514&6.766&6.559&-.058& .252& .162& .103&  6 \cr
49298.0031&6.558&6.505&6.741&6.557&-.053& .236& .132& .105&  6 \cr
49316.9498&6.561&6.509&6.744&6.562&-.052& .235& .129& .105&  6 \cr
49317.9473&6.576&6.519&6.750&6.563&-.057& .231& .143& .101&  6 \cr
49323.9331&6.567&6.506&6.752&6.559&-.061& .246& .140& .114&  6 \cr
49324.9286&6.569&6.509&6.738&6.545&-.060& .229& .157& .096&  6 \cr
49325.9253&6.566&6.509&6.748&6.561&-.057& .239& .135& .109&  6 \cr
49337.8906&6.575&6.519&6.768&6.567&-.056& .249& .153& .104&  6 \cr
49338.8881&6.570&6.518&6.768&6.565&-.052& .250& .156& .099&  6 \cr
49353.8461&6.562&6.506&6.744&6.561&-.056& .238& .128& .111&  6 \cr
49360.8301&6.556&6.502&6.755&6.552&-.054& .253& .153& .104&  6 \cr
49369.8012&6.567&6.513&6.755&6.560&-.054& .242& .148& .101&  6 \cr
49374.7900&6.577&6.520&6.760&6.572&-.057& .240& .136& .109&  6 \cr
49653.0277&6.568&6.502&6.748&6.564&-.066& .246& .122& .128&  6 \cr
49654.0246&6.571&6.507&6.750&6.562&-.064& .243& .133& .119&  6 \cr
49657.0173&6.586&6.524&6.774&6.566&-.062& .250& .166& .104&  6 \cr
49661.9958&6.563&6.503&6.741&6.561&-.060& .238& .122& .118&  6 \cr
49663.0011&6.563&6.506&6.745&6.559&-.057& .239& .133& .110&  6 \cr
49665.9931&6.578&6.520&6.775&6.562&-.058& .255& .171& .100&  6 \cr
49666.9906&6.579&6.519&6.767&6.568&-.060& .248& .150& .109&  6 \cr
49670.9779&6.560&6.500&6.746&6.555&-.060& .246& .136& .115&  6 \cr
49671.9383&6.560&6.506&6.738&6.562&-.054& .232& .120& .110&  6 \cr
49676.9509&6.578&6.518&6.772&6.564&-.060& .254& .162& .106&  6 \cr
49684.9416&6.584&6.523&6.778&6.570&-.061& .255& .161& .108&  6 \cr
49685.9382&6.579&6.519&6.768&6.558&-.060& .249& .171& .099&  6 \cr
49686.9367&6.569&6.519&6.762&6.557&-.050& .243& .167& .088&  6 \cr
49687.9342&6.574&6.511&6.757&6.560&-.063& .246& .148& .112&  6 \cr
49688.9314&6.566&6.512&6.753&6.555&-.054& .241& .155& .097&  6 \cr
49689.9280&6.561&6.506&6.742&6.558&-.055& .236& .132& .107&  6 \cr
50060.8981&6.574&6.516&6.764&6.552&-.058& .248& .176& .094&  6 \cr
50062.8996&6.566&6.510&6.742&6.549&-.056& .232& .154& .095&  6 \cr
50065.8803&6.565&6.507&6.748&6.572&-.058& .241& .111& .123&  6 \cr
50084.7590&6.563&6.507&6.743&6.559&-.056& .236& .132& .108&  6 \cr
50086.7475&6.575&6.518&6.771&6.561&-.057& .253& .167& .100&  6 \cr
50087.7906&6.578&6.521&6.764&6.561&-.057& .243& .163& .097&  6 \cr
50093.7823&6.566&6.508&6.744&6.568&-.058& .236& .116& .118&  6 \cr
50095.7735&6.580&6.516&6.762&6.571&-.064& .246& .136& .119&  6 \cr
50096.7748&6.575&6.522&6.772&6.568&-.053& .250& .158& .099&  6 \cr
50097.7668&6.576&6.519&6.767&6.565&-.057& .248& .156& .103&  6 \cr
50100.7636&6.572&6.508&6.754&6.548&-.064& .246& .166& .104&  6 \cr
50103.7599&6.572&6.507&6.757&6.560&-.065& .250& .144& .118&  6 \cr
50106.7746&6.579&6.523&6.769&6.567&-.056& .246& .158& .100&  6 \cr
50107.7708&6.573&6.517&6.774&6.561&-.056& .257& .169& .100&  6 \cr
50108.7680&6.574&6.511&6.758&6.557&-.063& .247& .155& .109&  6 \cr
50109.7650&6.562&6.503&6.744&6.541&-.059& .241& .165& .097&  6 \cr
50117.7493&6.573&6.513&6.764&6.560&-.060& .251& .157& .107&  6 \cr
50119.7309&6.556&6.505&6.751&6.557&-.051& .246& .142& .103&  6 \cr
\noalign{\smallskip}\hline
\end{tabular}
\end{flushleft}
\end{table*}

\setcounter{table}{4}
\begin{table*}
\caption[]{Radial velocities and He I 447.1 spectrophotometry
of \vo from the David Dunlap Observatory photographic spectrograms}
\scriptsize
\label{rvDDO}
\begin{flushleft}
\begin{tabular}{lrrrrrrrr}
\hline\noalign{\smallskip}
  HJD & \rv & \rv & \rv & \rvb & RV & FWHM   &  I$_{\rm c}$ & EW \cr
-2400000& mean H+He& He I& He 416.9& Mg II& Ca II& He 447.1& He 447.1& He 447.1\cr
         & (\kms) & (\kms) & (\kms) & (\kms)& (\kms)&  (nm)&  & (nm)  \cr
\noalign{\smallskip}\hline\noalign{\smallskip}
44950.708 &   7.1&   8.1&  20.7& 101.2  & 23.8 & 0.71  & 0.715 &  0.237 \cr
44950.815 &  11.3&  13.0&  29.1&  95.8  & 22.7 & 0.57  & 0.715 &  0.214 \cr
44959.589 &  45.5&  53.9&  56.4& -36.0  & 19.8 & 0.59  & 0.730 &  0.201 \cr
44959.697 &  49.1&  56.7&  76.1& -36.7  & 19.7 & 0.70  & 0.720 &  0.228 \cr
44959.820 &  56.3&  66.5&  75.2& -31.3  & 20.6 & 0.54  & 0.710 &  0.192 \cr
45268.835 &  13.4&  12.9&  29.1&  78.4  & 23.9 & 0.68  & 0.725 &  0.210 \cr
45292.811 &  39.7&  47.8&  38.0& -09.2  & 17.7 & 0.55  & 0.760 &  0.160 \cr
45310.733 &  35.0&  40.3&  64.0&   4.8  & 19.1 & 0.56  & 0.735 &  0.174 \cr
45321.617 &  -9.2& -13.3& -12.4& 127.9  & 22.6 & 0.56  & 0.755 &  0.160 \cr
45356.498 &  38.8&  43.8&  48.9&  16.2  & 19.7 & 0.46  & 0.725 &  0.162 \cr
45362.563 &  12.3&  14.0&  34.4&  65.0  & 22.3 & 0.65  & 0.705 &  0.220 \cr
45363.522 &  23.5&  24.6&  43.5&  50.3  & 23.3 & 0.57  & 0.705 &  0.210 \cr
45379.511 &  -2.7&  -4.5&  -7.4& 103.2  & 21.1 & 0.55  & 0.730 &  0.194 \cr
45394.537 &  12.8&  12.6&  30.1&  61.7  & 19.9 & 0.58  & 0.780 &  0.146 \cr
45411.531 &  56.0&  57.0&   -- &   --   &  --  & 0.45  & 0.750 &  0.135 \cr
45417.549 &  10.6&   9.3&  22.2&  92.5  & 24.5 & 0.66  & 0.700 &  0.236 \cr
45629.782 &  41.4&  51.0&  66.8& -16.6  & 20.5 & 0.54  & 0.750 &  0.157 \cr
45638.803 & -14.7& -18.5& -19.9& 119.2  & 20.8 & 0.62  & 0.740 &  0.185 \cr
45646.747 &  39.4&  48.5&  60.5& - 7.9  & 15.9 & 0.38  & 0.750 &  0.135 \cr
45656.707 &  -9.3& -13.7&  -7.7& 128.6  & 22.4 & 0.53  & 0.755 &  0.150 \cr
45656.785 & -13.6& -19.8& -19.5& 137.9  & 19.7 & 0.59  & 0.760 &  0.167 \cr
45660.723 &   7.6&   7.6&   0.3&  69.0  & 22.3 & 0.60  & 0.730 &  0.215 \cr
45661.783 &  18.8&  18.5&  30.7&  48.3  & 20.2 & 0.62  & 0.720 &  0.214 \cr
45719.562 &  30.3&  35.1&  71.9&  25.6  & 20.2 & 0.58  & 0.720 &  0.192 \cr
45719.689 &  35.2&  45.0&  77.5&  34.9  & 22.5 & 0.45  & 0.740 &  0.155 \cr
45731.524 & -15.9& -23.0& -15.9& 138.6  & 16.0 & 0.50  & 0.760 &  0.164 \cr
45746.594 &  63.6&  74.4&  84.9& -46.7  & 18.7 & 0.55  & 0.730 &  0.195 \cr
46037.796 &  39.6&  53.0&  66.5&   4.8  & 18.0 & 0.49  & 0.735 &  0.146 \cr
46074.713 &  39.9&  50.6&  43.5&   3.5  & 20.1 & 0.45  & 0.740 &  0.135 \cr
\noalign{\smallskip}\hline
\end{tabular}
\end{flushleft}
\end{table*}

\end{document}
