%%%%%%%%%%%% TeX version of a Man-Page
\documentstyle{article}
\raggedbottom\textwidth=16.5cm\textheight=23cm
\topmargin=-1.5cm\oddsidemargin=0.5cm\evensidemargin=0cm

\input{manpage.tex}
\begin{document}
\input{anafile.tex}
\clearpage
\input{tofits.tex}
\clearpage
\input{tdat.tex}
\end{document}
